Módulo do día xuliano
O módulo da calculadora do día xuliano
Día xuliano
This module converts between the calendar date, the Julian Day, and the Modified Julian Day. The Modified Julian Day is simply equal to the Julian Day - 2,400,000.5.
To use the module, select which of the three dates will be the input, and then fill in its value. Then press the Compute button, and the corresponding values for the other two date systems will be displayed.
Exercicio:
A que data do calendario corresponde o día xuliano modificado = 0,0?