Color Wheel

KWGray Ramp

1 Degree Radial LinesImageable Area

Page Size: xinxmm

Lower-Left: xinxmm

Upper-Right: xinxmm

Resolution: 72x72dpi2827x2827dpmInformationHPLIP Version: %(VERSION)sModel: %(MODEL)sSerial No.: %(SERIAL)sURI: %(URI)s

HPLIP Printer Test PagePrinted UsingHP Linux Imagingand Printing System